;-------------------------------------------------------------------------------
;------ disable params ---------------------------------------------------------

[disable]
linear_factor		= 1.0
angular_factor		= 1.0

;-------------------------------------------------------------------------------
;------ capture params ---------------------------------------------------------

[capture]
bone				= bip01_tail			; bone for capture
distance			= 0.3					; distance - less this distance between bone and capture taget object is captured
time_limit       	= 3			        	; max time for trying to capture object "sec"
pull_force       	= 3000					; max force used to bring the taget to capture bone
pull_distance   	= 1.5					; max distance taget can be puled
velocity_scale   	= 0.05					; velocity scale for pulling 1- normal
capture_force    	= 90000					; max force for holding taget

;-------------------------------------------------------------------------------
;------ particle bones ---------------------------------------------------------

[particle_bones]
bip01_head 			= 0,0,0
bip01_spine 		= 0,0,0
; bip01_l_upperarm	= 0,0,0
; bip01_r_upperarm	= 0,0,0
bip01_l_forearm		= 0,0,0
bip01_r_forearm 	= 0,0,0
bip01_l_thigh 		= 0,0,0
bip01_r_thigh 		= 0,0,0
bip01_l_calf 		= 0,0,0
bip01_r_calf 		= 0,0,0

;-------------------------------------------------------------------------------
;------ immunities section -----------------------------------------------------

[immunities]
immunities_sect = medium_resistance

[bone_protection]
bones_protection_sect = kombez_kupol_damage

;-------------------------------------------------------------------------------
;------ End params -------------------------------------------------------------